         180           8
   3.22422217639150        3.10472640837033        2.97355983724915     
   2.84588361179392        2.68812053242925        2.51655828418318     
   2.37173374455692        2.18475846930925     
  -16.6139332355920       -16.4595548315703       -16.1248252153828     
  -15.7411253064423       -15.3404018782436       -14.9327329013196     
  -14.5153049698027       -14.1954652172058     
  1.859677576954590E-003  0.000000000000000E+000
  0.988946602795459       0.000000000000000E+000
  0.991847638500006       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
