         180           3
   2.46620023992383       0.939550402882436      -3.598145501563734E-002
  -6.25075868537824       -6.13470113034704       -5.94435355064622     
 -2.067146084072585E-003  0.000000000000000E+000
   1.00201525949142       0.000000000000000E+000
  0.998721669387212       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
