         180           8
  -2.04551998371902       -2.40046288430531       -2.64658025653469     
  -2.87874795320212       -3.16690145964506       -3.50497568750958     
  -3.74432126750055       -4.01155365738687     
  -15.5088259121492       -15.7177913467079       -16.0552898345945     
  -16.3069294108485       -16.5309371151811       -16.7615439478991     
  -16.9780821256358       -17.1233796798516     
  1.782697240180118E-003  0.000000000000000E+000
  0.988063650108106       0.000000000000000E+000
  0.991009771111775       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
