         180           3
 -0.619487498874407       -1.75115020819501       -2.51695028095355     
  -8.64137290673028       -8.68146326731414       -8.95892314621085     
 -1.258048405734131E-003  0.000000000000000E+000
   1.00187547866184       0.000000000000000E+000
  0.998802478594121       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
