         180           8
   3.52130594612462        3.18003066996488        2.79881509892554     
   2.42085819978266        2.05360590676320        1.63011756261870     
   1.14062684046085       0.858500688067122     
  -17.6798854813962       -18.0106859073908       -18.2459411711255     
  -18.5255847693075       -18.8541626806470       -19.0881264312842     
  -19.2502576626469       -19.3903303215654     
  1.832526032030877E-003  0.000000000000000E+000
  0.988524975635773       0.000000000000000E+000
  0.991501213695198       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
