         180           3
 -0.533669443038526       -2.73577106359166       -4.39784973979153     
  -10.9746853164879       -11.0806111809655       -11.2654918486462     
 -8.238574041447997E-004  0.000000000000000E+000
   1.00178692633073       0.000000000000000E+000
  0.998733617539747       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
