         180           8
   8.75095830963194        8.30831315488899        7.90193794669535     
   7.54643602125294        7.19758406566932        6.92345669752179     
   6.67919700676155        6.54297096615218     
  -18.5676850567988       -19.0528236917631       -19.3038740201213     
  -19.5683947493277       -19.8639788723068       -20.2495125579132     
  -20.6268964923754       -20.9417164270241     
  1.911053731959080E-003  0.000000000000000E+000
  0.988713954433388       0.000000000000000E+000
  0.991753544134155       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
