         180           3
 -0.778638520616525       -2.05426527638855       -2.43646457005426     
  -8.79880271932649       -8.87797853617321       -9.09558821212318     
 -1.301721267727884E-003  0.000000000000000E+000
   1.00176430978867       0.000000000000000E+000
  0.998784175351809       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
