         180           8
   3.69189095005271        3.30401464502113        2.91755991173118     
   2.56552676103549        2.21819803374165        1.93358018707868     
   1.74113321203843        1.40418518737637     
  -17.9373169415520       -18.1947904018445       -18.4172421639440     
  -18.6839556691705       -18.9792988543347       -19.2639805451829     
  -19.5123443255437       -19.8069949660691     
  1.677037154329296E-003  0.000000000000000E+000
  0.988734140276732       0.000000000000000E+000
  0.991760047025012       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
