         180           8
   3.19645739348529        2.84315538921187        2.44495557564825     
   2.11423492297243        1.82077335012559        1.47000988616152     
   1.11945807149585       0.955608594543898     
  -17.4452852497872       -17.9430707682402       -18.3184300407791     
  -18.7520185027160       -19.1515091086182       -19.4112696259741     
  -19.5953126884959       -19.8794796098176     
  1.574498708609433E-003  0.000000000000000E+000
  0.989097683838076       0.000000000000000E+000
  0.992083154705747       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
