         180           8
   2.54575154165592        2.28128122371205        1.90680306276958     
   1.50694213226225        1.16851416238170       0.903250119242173     
  0.624439437173611       0.523996463022283     
  -16.5998722641478       -16.8615114108683       -17.1731695768826     
  -17.5424341917612       -17.9455888882777       -18.2358813016566     
  -18.3700045091677       -18.5500873586834     
  1.772523541032771E-003  0.000000000000000E+000
  0.988723137485944       0.000000000000000E+000
  0.991541236792359       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
