         180           8
   6.83618187641886        6.37431114770052        5.95847677940189     
   5.60163305641248        5.21870585314902        4.90690252218785     
   4.62502153479251        4.21589579511583     
  -18.0747187811953       -18.3486992520266       -18.6899782272417     
  -18.9463727807535       -19.1403892098298       -19.4433166901914     
  -19.8531486658266       -19.9841426734070     
  1.976925828477907E-003  0.000000000000000E+000
  0.988489836414752       0.000000000000000E+000
  0.991419249094110       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
