         180           8
   1.61170898796530        1.28503958140452       0.921992059400733     
  0.583628994905589       0.119520838759480      -0.342333288281918     
 -0.605980170154090      -0.932950459070002     
  -17.6688331966857       -17.8165529288135       -18.1183841882560     
  -18.3640650808120       -18.5151199987436       -18.5738036887494     
  -18.6882236119562       -18.7808642150286     
  1.530612418150197E-003  0.000000000000000E+000
  0.988774617762344       0.000000000000000E+000
  0.991722707881182       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
