         180           8
  0.262794938887827      -0.318418262897558      -0.873551291767353     
  -1.42399764180184       -1.95759830380561       -2.37752187464905     
  -2.62360346098698       -2.79097957618279     
  -9.46077132280542       -9.56941200253238       -9.67211246244417     
  -9.30940904847911       -9.54980204479726       -9.93716075468392     
  -9.98624968969516       -9.65378824017591     
 -1.368273155782729E-003  0.000000000000000E+000
   1.00180305139302       0.000000000000000E+000
  0.998788020047300       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
