         180           8
   4.12575303283946        3.64849013266196        3.33341130360986     
   2.98330615981666        2.61829791879503        2.24233730513715     
   1.90804005229134        1.70206636037827     
  -17.4559892471956       -17.9138546434678       -18.5014218292424     
  -18.6933271831775       -19.1402841782533       -19.6666711848506     
  -19.9372015531056       -20.3088680887073     
  1.487802983547285E-003  0.000000000000000E+000
  0.989144464658382       0.000000000000000E+000
  0.992203178632027       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
