         180           8
  -1.81090053630771       -1.89333543203415       -2.03251746855458     
  -2.16333029956727       -2.32230481989776       -2.41441481713412     
  -2.53038545229526       -2.66257010887633     
  -9.32525002738335       -9.29593781718311       -9.03002831130899     
  -8.71854361134744       -8.39541793969006       -8.06991430829483     
  -7.67426400873025       -7.39022850122983     
  1.498419618430660E-003  0.000000000000000E+000
  0.987960075997450       0.000000000000000E+000
  0.990950379205206       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
