         180           3
   23.1319768822358        20.1604738247369        17.1257320441458     
  -32.6878295269707       -33.1086261462965       -33.5446791296646     
  1.422380401204994E-003  0.000000000000000E+000
  0.987155318231739       0.000000000000000E+000
  0.984269430652349       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
