         180           3
   21.5453938940997        18.5420013030952        15.8654154378991     
  -31.9006048907480       -32.0000072922487       -31.8920793261084     
  1.261329510146120E-003  0.000000000000000E+000
  0.987140160209241       0.000000000000000E+000
  0.984212769657807       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
