         180           8
   14.3555385672337        13.5834230725739        12.8422895447323     
   12.0877956260789        11.3068368870955        10.5196393190718     
   9.76424324631672        9.01455067502264     
  -32.7632552462998       -32.8093692329958       -32.9026011933449     
  -33.0336770697984       -33.1876988913286       -33.3590087373931     
  -33.5369530226421       -33.6129117089741     
 -9.629798681776585E-003  0.000000000000000E+000
   1.01004190932437       0.000000000000000E+000
   1.01454552610558       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
