         180           3
   23.4149193547358        20.5402440982540        17.4923926608357     
  -33.0221819019706       -33.4778993478955       -33.6837028931481     
  1.540102464519256E-003  0.000000000000000E+000
  0.987111485739391       0.000000000000000E+000
  0.984237311384836       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
