         180           8
   17.9331861366356        17.1231742885443        16.3682851444258     
   15.5821304056951        14.7956825267085        14.0178594254235     
   13.2704936113943        12.5460540636926     
  -33.0856334623994       -33.1578315978636       -33.2560270358328     
  -33.4004063693991       -33.5550034295081       -33.7604576526024     
  -33.9854416641350       -34.1782902429310     
 -9.532663121802877E-003  0.000000000000000E+000
   1.01008037285818       0.000000000000000E+000
   1.01461230875639       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
