         180           3
   21.1846711259229        18.1660333078321        15.7388644776661     
  -31.3787583700131       -31.3479740619729       -31.4265074602746     
  1.123649658021542E-003  0.000000000000000E+000
  0.987218441805140       0.000000000000000E+000
  0.984263099087606       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
