         180           8
   13.4033927119841        12.6129530181182        11.7961258314937     
   10.9871800158003        10.2343706734306        9.43830559481519     
   8.63912184842552        7.82957024336033     
  -32.3925382819036       -32.5590755109984       -32.6280088137886     
  -32.7624507123293       -32.9590108561891       -33.1646034960872     
  -33.3318506165783       -33.4293045360399     
 -9.762619351472679E-003  0.000000000000000E+000
   1.01024129092273       0.000000000000000E+000
   1.01425721618469       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
