         180           8
   16.4819922770085        16.0028413475999        15.2147947994559     
   14.4628308678258        13.5870383808939        12.7966034837470     
   12.1582415943305        11.3091841385030     
  -29.3976626325516       -31.2148955353124       -32.1021827142469     
  -32.6059075158345       -32.9738248791749       -33.2129655679257     
  -33.4757501411873       -33.6223055991548     
 -9.718913244298237E-003  0.000000000000000E+000
   1.01102475956820       0.000000000000000E+000
   1.01490130711132       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
