         180           3
   23.9974639931527        21.0449830022429        18.3242616479700     
  -34.6541716449616       -34.5846272819380       -34.7839274826059     
  4.473324763306622E-004  0.000000000000000E+000
  0.987554776212721       0.000000000000000E+000
  0.984739543714175       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
