         180           8
   13.2586052566428        12.5958702970623        11.8170842305220     
   11.0578576971727        10.2743361888033        9.52024843068477     
   8.80218414966505        8.13800067275629     
  -34.1795079410172       -34.2657914415036       -34.3077636803161     
  -34.3795273017518       -34.5047509828546       -34.6931066818375     
  -34.9365518823484       -35.1916635010315     
 -9.921040337962990E-003  0.000000000000000E+000
   1.01013974746649       0.000000000000000E+000
   1.01407312892591       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
