         180           3
   26.8849083392683        23.9660298072135        21.2285527997628     
  -29.4361088568297       -29.5619388718626       -29.4819684036776     
  1.671995304422046E-003  0.000000000000000E+000
  0.987067947393970       0.000000000000000E+000
  0.984310297560702       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
