         180           3
   27.0619168715309        24.1545250641265        21.1465227846800     
  -30.5370420871780       -31.0608062440142       -31.2516507014239     
  1.667815295548029E-003  0.000000000000000E+000
  0.987053071864621       0.000000000000000E+000
  0.984182334741970       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
