         180           8
   19.0495666257013        18.1362448613420        17.3562640824855     
   16.5481346593989        15.7506275975472        14.9739004058006     
   14.2890831697081        13.5529076599324     
  -29.8116505643759       -30.0663638832245       -30.2343678468520     
  -30.4037114990978       -30.6046377095179       -30.8082996350542     
  -31.0027018420839       -31.3931025081652     
 -9.009353725355652E-003  0.000000000000000E+000
   1.00993775883921       0.000000000000000E+000
   1.01383959759104       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
