         180           8
   23.8325547311411        23.2919825897765        22.8014041644329     
   22.3414083493049        21.9784861535532        21.6253305928328     
   21.2363317325823        20.9121418770110     
  -33.4553206610452       -33.7799805874901       -34.1005011982649     
  -34.4950085176138       -34.8184732920927       -35.0649966708075     
  -35.2678010599793       -35.7235435235140     
 -8.323062655218949E-003  0.000000000000000E+000
   1.00914911254615       0.000000000000000E+000
   1.01358701121631       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
