         180           8
   17.3974773940018        17.2217356354942        17.0453284887252     
   16.8450330740965        16.6357291823316        16.4833793206813     
   16.3713526427364        16.1633545970036     
  -33.0337029375858       -33.0962021388983       -32.9019955599063     
  -32.6694464764661       -32.4254071880064       -32.1844983540463     
  -31.8751709859181       -31.5790620354120     
 -8.734178498133545E-003  0.000000000000000E+000
   1.00924992839108       0.000000000000000E+000
   1.01301331244831       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
