         180           3
   22.7693286148930        24.0180614749766        25.4630184447192     
  -35.1767461811376       -34.6575169486015       -33.5233176024161     
  2.070070655752600E-003  0.000000000000000E+000
  0.986859337490353       0.000000000000000E+000
  0.984101492684051       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
