         180           8
   21.3453210117442        21.1681569667451        20.9577504433929     
   20.7367713854865        20.5288778020231        20.3357152285986     
   20.1807575317755        19.9406740487807     
  -33.5925012192123       -33.4271047533716       -33.3085967314035     
  -33.0912680936638       -32.7721771214663       -32.5187028082817     
  -32.2603341295986       -31.8745451382981     
 -8.649283038902075E-003  0.000000000000000E+000
   1.00961467314629       0.000000000000000E+000
   1.01329336449254       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
