         180           8
   19.1737384292564        18.4170267432883        17.6368791553415     
   16.8824129964315        16.0882717412729        15.3790831081222     
   14.7543548806575        14.1236664781235     
  -29.1483763667873       -29.1938721390240       -29.2939922085022     
  -29.4062702890961       -29.7019552679318       -30.0839767803677     
  -30.2494996257230       -30.3131249304226     
 -8.708765139046677E-003  0.000000000000000E+000
   1.00944202815910       0.000000000000000E+000
   1.01398655591416       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
