         180           3
   26.3609778308389        23.4356211252142        21.6200478247890     
  -27.3338294980880       -27.0524068675248       -27.2598109560621     
  1.321958153343925E-003  0.000000000000000E+000
  0.986887302663712       0.000000000000000E+000
  0.984301839438125       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
