         180           8
   15.1405442096465        14.5875644336067        13.8895972313476     
   13.1615142820727        12.4400919318518        11.7517280856353     
   11.0703234637585        10.5220270764285     
  -28.5644022180571       -28.8334636208216       -28.8642100411446     
  -28.9332247059035       -29.0775604877516       -29.2441870262061     
  -29.3467551916161       -29.4881545588699     
 -8.823511254260041E-003  0.000000000000000E+000
   1.00964727235959       0.000000000000000E+000
   1.01324926654398       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
