         180           3
   27.1363544009362        24.2514065673625        21.7133566855104     
  -29.0067045762444       -29.2169379130185       -29.2739479170735     
  1.691016080689482E-003  0.000000000000000E+000
  0.986939493637563       0.000000000000000E+000
  0.984336309247749       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
