         180           8
   19.2189612914675        18.3826390197692        17.6221453948461     
   16.8235209774181        16.0403658006350        15.2748552221289     
   14.5146848374639        13.8227682404975     
  -29.3517709607027       -29.4877910816743       -29.6419589061240     
  -29.7897856670059       -29.9462085947011       -30.1001135563501     
  -30.2292449560972       -30.3587333700489     
 -8.766366934256826E-003  0.000000000000000E+000
   1.00984376746134       0.000000000000000E+000
   1.01338186472187       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
