         180           3
   28.4856599863353        25.8250472200421        22.8583080491141     
  -29.4459857152213       -30.2818116062977       -30.9089959732478     
  1.959296495551387E-003  0.000000000000000E+000
  0.987027711780846       0.000000000000000E+000
  0.984279140634594       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
