         180           8
   21.5777987339248        20.8159492355093        20.0690408224300     
   19.2442119496947        18.3908718781457        17.7202021790556     
   17.1050549756476        16.2577301052236     
  -29.5632732274294       -29.7277475535498       -29.7820364326609     
  -29.9413317911470       -30.2759146666966       -30.6251055908117     
  -30.7252853957530       -30.8573721341492     
 -8.679949630526682E-003  0.000000000000000E+000
   1.00992542788052       0.000000000000000E+000
   1.01400747021329       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
