         171           8
   25.1454530022652        24.6235701502134        24.1212644541627     
   23.7050099648857        23.3322787794788        22.9744084519066     
   22.6419782637930        22.4748259221377     
  -32.1323318032569       -32.3990419834401       -32.6482283485804     
  -32.9455245196845       -33.1222940785640       -33.1853874122798     
  -33.2949588480088       -33.4614398549015     
 -8.239015724071503E-003  0.000000000000000E+000
   1.00939936144639       0.000000000000000E+000
   1.01398702207368       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
