         180           3
   26.3126110069365        23.1041620266612        21.1075177787515     
  -27.2987959170638       -26.9565531541511       -27.0584038855414     
  1.477980669549508E-003  0.000000000000000E+000
  0.986983233434066       0.000000000000000E+000
  0.984229903347647       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
