         180           8
   16.2074844189147        15.4671333349132        14.7145053570676     
   13.9105782649603        13.0752584115204        12.2817816920707     
   11.5826326941637        10.9266507732032     
  -28.4947962038669       -28.4897328563895       -28.4818647741412     
  -28.5177172031530       -28.6181136659234       -28.6914210446166     
  -28.7477404459172       -28.9620501567712     
 -8.756114195516777E-003  0.000000000000000E+000
   1.00921306423475       0.000000000000000E+000
   1.01342675141209       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
