         180           8
   21.4137319003447        20.7562551894661        20.2496729087573     
   19.7625220114661        19.3187183847998        18.8253144898842     
   18.3400808146793        18.1460178441798     
  -31.1133894099640       -31.2277085837385       -31.3682583428258     
  -31.4138033490453       -31.4007262302170       -31.6171795255515     
  -32.0401756689981       -32.3248226609389     
 -8.233546577144459E-003  0.000000000000000E+000
   1.00901288619898       0.000000000000000E+000
   1.01347878179788       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
