         180           3
   27.5432460730166        24.8425205566544        23.1329339385157     
  -27.7936956263446       -27.5887330815253       -27.7607554058712     
  1.256548482672392E-003  0.000000000000000E+000
  0.987063890181161       0.000000000000000E+000
  0.984180573690680       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
