         180           8
   15.2156251063039        14.6527677497865        14.0063491915456     
   13.3749745011922        12.7108911186054        11.9949792812185     
   11.3800229965014        10.7517249212263     
  -28.8348745839882       -29.0836232623909       -29.1242664093101     
  -29.2198340195205       -29.4351654670838       -29.6127777413959     
  -29.6799683263942       -29.6766654119768     
 -8.725333249216276E-003  0.000000000000000E+000
   1.00926738062861       0.000000000000000E+000
   1.01307837304528       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
