         180           8
   13.8629527867505        13.6913652026794        13.4998956798926     
   13.3029647376120        13.1021287281363        12.8367416631529     
   12.6252305113161        12.3264047302570     
  -33.3791289417945       -33.1959261828320       -32.9291469233940     
  -32.6426747309444       -32.3401437953022       -32.0198127526851     
  -31.6977604807413       -31.3427521880608     
 -8.782236682054901E-003  0.000000000000000E+000
   1.00956413699477       0.000000000000000E+000
   1.01414550199176       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
