         180           3
   22.3085659056068        23.5562349111193        24.9824066711705     
  -35.6815958017772       -35.3120867717675       -34.4469182411111     
  1.764227084699722E-003  0.000000000000000E+000
  0.987315973977332       0.000000000000000E+000
  0.984751460183157       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
