         180           8
   19.9332371588782        19.7174330252750        19.5365541637889     
   19.3632849358102        19.2073902530696        19.0267607653562     
   18.8365594056501        18.7509997755970     
  -34.4752743030918       -34.1985717145853       -34.0473063092193     
  -33.8693580492902       -33.6396702237060       -33.3696514534504     
  -33.1192035434442       -32.7290268934306     
 -8.639265708119908E-003  0.000000000000000E+000
   1.00955095230115       0.000000000000000E+000
   1.01395519532625       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
