         180           8
   25.3133682470955        25.2412986246899        25.0550281772349     
   24.9151889335364        24.7996813182334        24.6760427009491     
   24.4718305811065        24.2085102460342     
  -34.7541074603829       -34.4848542652161       -34.2082906169282     
  -33.8034272972290       -33.4200826525533       -33.0793871034957     
  -32.7537564593704       -32.4139734191631     
 -8.578411746059139E-003  0.000000000000000E+000
   1.01039567024036       0.000000000000000E+000
   1.01452448240863       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
